\begin{Schunk}
\begin{Sinput}
 plotPlane(mod2, plotx1 = "satis", plotx2 = "jobperf", drawArrows = TRUE, alwd = 0.45, alength = 0.08)
\end{Sinput}
\end{Schunk}
