\begin{Schunk}
\begin{Sinput}
 plotSlopes(mod1, plotx = "elevationP100", xlab="Elevation (100s feet)", ylab="Annual Temperature Average", interval = "confidence")
\end{Sinput}
\end{Schunk}
