\begin{Schunk}
\begin{Sinput}
 plot(-1:10, -1:10, type = "n", xlim = c(-1, 10), ylim = c(-1,10), axes = FALSE, bty = "n", xlab = "one x variable", ylab = "one y variable")
 axis(1, pos = 0, at = seq(1, 10, by = 1))
 axis(2, pos = 0, at = seq(1, 10, by = 1))
 abline(a = 2.7, b = 0.55)
 abline(v = 0)
 abline(h = 0)
\end{Sinput}
\end{Schunk}
