\begin{Schunk}
\begin{Sinput}
 predictOMatic(glm1, predVals = c(x2 = "seq"), n = 10)
\end{Sinput}
\begin{Soutput}
          x2          fit
1    0.00000 0.0004211702
2   16.66667 0.0029945053
3   33.33333 0.0209611159
4   50.00000 0.1324087151
5   66.66667 0.5210494822
6   83.33333 0.8857780288
7  100.00000 0.9822314635
8  116.66667 0.9974686620
9  133.33333 0.9996441153
10 150.00000 0.9999500592
\end{Soutput}
\end{Schunk}
