\begin{Schunk}
\begin{Sinput}
 plot(bl5roc, print.auc = TRUE, xlab = "specificity = TNR = 1 - FPR", ylab = "Sensitivity = TPR = 1 - FNR")
\end{Sinput}
\end{Schunk}
