\begin{Schunk}
\begin{Sinput}
 predictOMatic(bushideoglm1, predVals = list(ideoln=1:7), interval="confidence")
\end{Sinput}
\begin{Soutput}
rockchalk:::predCI: model's predict method does not return an interval.
 We will improvize with a Wald type approximation to the confidence interval 
  ideoln        fit        lwr        upr
1      1 0.04744458 0.02958016 0.07526117
2      2 0.11430586 0.08222787 0.15676037
3      3 0.25060247 0.20648066 0.30058110
4      4 0.46423380 0.42128941 0.50771522
5      5 0.69185001 0.65036346 0.73045414
6      6 0.85331917 0.81477941 0.88497190
7      7 0.93778746 0.91009824 0.95734824
\end{Soutput}
\end{Schunk}
