\begin{Schunk}
\begin{Sinput}
 summary(mod1)
\end{Sinput}
\begin{Soutput}
lavaan (0.5-23.1097) converged normally after  32 iterations

  Number of observations                          1160

  Estimator                                         ML
  Minimum Function Test Statistic                9.043
  Degrees of freedom                                 6
  P-value (Chi-square)                           0.171

Parameter Estimates:

  Information                                 Expected
  Standard Errors                             Standard

Latent Variables:
                   Estimate  Std.Err  z-value  P(>|z|)
  V =~                                                
    v1                0.727    0.040   18.026    0.000
    v2                0.645    0.038   16.858    0.000
  C =~                                                
    c1                0.787    0.265    2.969    0.003
    c2                0.311    0.108    2.876    0.004
  S =~                                                
    s1                0.648    0.038   16.959    0.000
    s2                0.721    0.040   18.012    0.000

Covariances:
                   Estimate  Std.Err  z-value  P(>|z|)
  V ~~                                                
    C                 0.086    0.052    1.648    0.099
    S                 0.591    0.038   15.370    0.000
  C ~~                                                
    S                -0.104    0.055   -1.891    0.059

Variances:
                   Estimate  Std.Err  z-value  P(>|z|)
   .v1                0.471    0.050    9.460    0.000
   .v2                0.583    0.043   13.438    0.000
   .c1                0.380    0.416    0.915    0.360
   .c2                0.902    0.075   12.040    0.000
   .s1                0.579    0.043   13.315    0.000
   .s2                0.479    0.049    9.752    0.000
    V                 1.000                           
    C                 1.000                           
    S                 1.000                           
\end{Soutput}
\end{Schunk}
