\begin{Schunk}
\begin{Sinput}
 library(methods)
 slotNames(stanm0)
\end{Sinput}
\begin{Soutput}
 [1] "model_name" "model_pars" "par_dims"   "mode"       "sim"        "inits"      "stan_args" 
 [8] "stanmodel"  "date"       ".MISC"     
\end{Soutput}
\end{Schunk}
