\begin{Schunk}
\begin{Sinput}
 predictOMatic(m0, interval = "confidence")
\end{Sinput}
\begin{Soutput}
$x1
          x1         x2         fit        lwr         upr
1 -1.9416696 0.03172283 -0.51957810 -0.9649748 -0.07418135
2 -1.0756371 0.03172283 -0.36854585 -0.6778744 -0.05921733
3 -0.0681562 0.03172283 -0.19284562 -0.4202329  0.03454168
4  0.9460424 0.03172283 -0.01597385 -0.3150284  0.28308066
5  1.9542074 0.03172283  0.15984570 -0.2967488  0.61644019

$x2
           x1          x2        fit        lwr        upr
1 -0.02845962 -1.89454252  1.1193641  0.6799328  1.5587955
2 -0.02845962 -0.93557042  0.4695400  0.1742902  0.7647898
3 -0.02845962 -0.06809952 -0.1182805 -0.3462894  0.1097283
4 -0.02845962  1.04552832 -0.8729033 -1.1749847 -0.5708220
5 -0.02845962  1.99089046 -1.5135050 -1.9596881 -1.0673218
\end{Soutput}
\end{Schunk}
