\begin{Schunk}
\begin{Sinput}
 library(rockchalk)
 ps20 <- plotSlopes(m0, plotx = "x2", modx = "x1", modxVals = "std.dev.", interval = "confidence")
\end{Sinput}
\end{Schunk}
