\begin{Schunk}
\begin{Sinput}
 N <- 1
 mvrnorm(N, m = mu, S = Sigma)
\end{Sinput}
\begin{Soutput}
[1]  2.647835 -1.278373 51.686729 15.517961
\end{Soutput}
\end{Schunk}
