\begin{Schunk}
\begin{Sinput}
 head(muhat)
\end{Sinput}
\begin{Soutput}
[1]  99.63456 101.39869  99.30975 100.96353  99.56550 100.93269
\end{Soutput}
\end{Schunk}
