\begin{Schunk}
\begin{Sinput}
 y <- rnorm(10, m = 100, s = 15)
 head(y)
\end{Sinput}
\begin{Soutput}
[1]  96.57619  87.93997  93.17366 104.17639 113.21681 100.65354
\end{Soutput}
\end{Schunk}
