\begin{Schunk}
\begin{Sinput}
 Rho.d <- diag(Rho)
 Rho.d
\end{Sinput}
\begin{Soutput}
[1] 1 1 1 1 1
\end{Soutput}
\begin{Sinput}
 all.equal(Rho.d, rep(1, times = 5))
\end{Sinput}
\begin{Soutput}
[1] TRUE
\end{Soutput}
\end{Schunk}
