\begin{Schunk}
\begin{Sinput}
 ## Don't delete this. It puts the interactive session options
 ## back the way they were. If this is compiled within a session
 ## it is vital to do this.
 options(opts.orig)
> options(par.orig)
\end{Sinput}
\end{Schunk}
