\begin{Schunk}
\begin{Sinput}
 plot(fitted(reg.mod.14), fitted(reg.mod.11), xlab = "Uncentered predictors", ylab = "Mean-Centered predictors", main = "Predicted Values")
\end{Sinput}
\end{Schunk}
