\begin{Schunk}
\begin{Sinput}
 fd[ , "v4"]
\end{Sinput}
\begin{Soutput}
[1]  0.1401390  0.2091844 -3.0360898 -0.4869341 -1.0878673
\end{Soutput}
\end{Schunk}
