\begin{Schunk}
\begin{Sinput}
 rnorm(n = 5, mean = 100, sd = 10)
\end{Sinput}
\begin{Soutput}
[1] 105.85529 107.09466  98.90697  95.46503 106.05887
\end{Soutput}
\end{Schunk}
