\begin{tabular}{*{3}{l}}
 \hline
                &\multicolumn{2}{c}{Bush-Kerry Thermometer Differential}   \\
                &Estimate &(S.E.) \\
 \hline
 \hline
  (Intercept)    & -54.647*  &   (8.06) \\
  Liberal        & -10.788  &   (7.931) \\
  Slight Lib.    &  2.375  &   (7.933) \\
  Moderate       &  5.612  &   (7.819) \\
  Slight Con.    &  10.141  &   (8.257) \\
  Conservative   &  17.499*  &   (8.341) \\
  Ext. Cons.     &  26.398*  &   (9.783) \\
  Weak Dem.      &  24.605*  &   (4.032) \\
  Indep. Lean Dem.   &  22.365*  &   (3.765) \\
  Independent    &  40.605*  &   (5.165) \\
  Indep. Lean Rep.   &  65.212*  &   (4.59) \\
  Weak Rep.      &  67.239*  &   (4.515) \\
  Str. Repub.    &  82.348*  &   (4.722) \\
  No Gay Marr    &  7.911*  &   (2.615) \\
  V043210Med     &  6.781  &   (5.84) \\
  Econ. Same     &  17.701*  &   (2.821) \\
  Econ. Better   &  25.083*  &   (3.278) \\
  V045145X2. Very good   & -7.623*  &   (2.528) \\
  V045145X3. Somewhat good   & -14.505*  &   (3.387) \\
  V045145X4. Not very good   & -14.672*  &   (6.141) \\
  V045145X7. Don't feel anything {VOL}   & -26.238*  &   (8.668) \\
  Female         &  0.284  &   (2.19) \\
 \hline 
 N                &803      &       \\
 RMSE            &29.95        & \\
 $R^2$           &0.712        & \\
 adj $R^2$       &0.704        & \\
 \hline
 \hline
 
 \multicolumn{2}{l}{${*}  p \le 0.05$   }\\
 \end{tabular}