\begin{Schunk}
\begin{Sinput}
  hist(x[ x > -50 & x < 50], xlab="x, excluding observations outside (-50,50)", prob= TRUE, breaks = 50, main="5000 Cauchies")
\end{Sinput}
\end{Schunk}
