\begin{Schunk}
\begin{Sinput}
 names(formals(hist.default))
\end{Sinput}
\begin{Soutput}
 [1] "x"              "breaks"         "freq"           "probability"    "include.lowest" "right"          "density"        "angle"          "col"            "border"         "main"          
[12] "xlim"           "ylim"           "xlab"           "ylab"           "axes"           "plot"           "labels"         "nclass"         "warn.unused"    "..."           
\end{Soutput}
\end{Schunk}
