\begin{Schunk}
\begin{Sinput}
  quantile(dat$moreNoise)
\end{Sinput}
\begin{Soutput}
        0%        25%        50%        75%       100% 
-1.6620502 -0.4028670  0.4911883  1.1338291  2.1968335 
\end{Soutput}
\end{Schunk}
